Setup has determined that your current display driver is NOT a 256 color display driver.

Morphology 101 recommends a 256 color display driver, or better.

The installation program for Matinee REQUIRES a 256 color display driver. You can switch to a display driver with MORE colors after you install Matinee, but it won't install at any color resolution other than 256.

If your display card has a 256 color driver, you should Exit this Setup program and switch to that driver, then rerun Morphology 101 Setup.

If your display card is not capable of 256 colors, you should NOT attempt to install Matinee.


	[ End of display driver warning message ]


